Glass
D

Divider

Crystalline Series

The Elegant Look of all Glass

Model:   C100 & C100A   Class:    Partition - Sneeze Guard

Model C100 & C100A are part of the Crystalline Series which featuring the all glass look is a favorite for Carving and Prep stations. The C100 is for straight counters and C100A is used on curved counters.  These partitions is characterized by the straight up front shield.  These partitions allow a  maximum of 42” between supports.   When multiple units are connected they have a continuous smooth front shield.  The C100 & C100A are designed to be able to connect to most of the other Crystalline  sneeze guards.

Crystal Clear 1/2” Safety Tempered Glass Supports
Straight and Curved Counter Installations
Four Standard heights,  18”, 22, 24, and 26”
Smooth Continious Front Shield
Five Standard Support Styles
Th

Support Options:

18”
22”
24”
26”

3”

12”

18”

22”

Tapered Post

Square Post

Options & Accessories

Closed

Deep
18” Depth

Extended
22” Depth

Glass Options        			Mounting Options			Metal Finish

3/8” Crystal Clear Glass
Radius Corners
Frosted Logo
Frosted glass

Tab Feet
Slim Legs
Saddle

Chrome
Powder Coat Color
RAL#
Other

Accessories

Heat Strips
LED Lights
Heat Strip / Light Combination

The “Deep” or “Extended” supports are required as end supports on NSF certified sneeze guards. The “Front”, “Open”, and “Sculpture” supports can  be used for internal supports in multi-bay configurations

1990 Hartog Dr.,  San Jose, CA  95131     Ph:  408-844-8335      Fax:  408-988-4423      www.glassdivider.com

R0001-05/15/13