Glass
D

Divider

Crystalline Series

The Elegant Look of all Glass

Model:   C102 & C102A   Class:    Partition - Sneeze Guard

Model C102 & C102A are part of the Crystalline Series which featuring the all glass look is a favorite for Carving and Prep stations. The C102 is for straight counters and C102A is used on curved counters.  This partition is characterized by the 10 degree slant on the front shield and allow a  maximum of 42” between supports.   When multiple units are connected they have a continuous smooth front shield.

Crystal Clear 1/2” Safety Tempered Glass Supports
Straight and Curved Counter Installations
Four Standard heights,  18”, 22, 24, and 26”
Smooth Continious Front Shield
Five Standard Support Styles
Th

Support Options:

18”
22”
24”
26”

3”

14”

18”

22”

Tapered Post

Square Post

Options & Accessories

Closed

Deep
18” Depth

Extended
22” Depth

Glass Options        			Mounting Options			Metal Finish

3/8” Crystal Clear Glass
Radius Corners
Frosted Logo
Frosted glass

Tab Feet
Slim Legs
Saddle

Chrome
Powder Coat Color
RAL#
Other

Accessories

Heat Strips
LED Lights
Heat Strip / Light Combination

The “Deep” or “Extended” supports are required as end supports on NSF certified sneeze guards. The “Tapered”, “Square”, and “Closed” supports can  be used for internal supports in multi-bay configurations.

1990 Hartog Dr.,  San Jose, CA  95131     Ph:  408-844-8335      Fax:  408-988-4423      www.glassdivider.com

R0001-05/15/13