Glass
D

Divider

Crystalline Series

The Elegant Look of all Glass

Model:   C107  Class:    Partition - Sneeze Guard

Model C107 represents a family of free-standing partition sneeze guards.  The C107 is quick and easy way to meet your sneeze guard needs. There are five standard heights, and thirteen standard widths . The NSF height requirements for a sneeze guard partition is for the top edge of the glass to be 60” or more above the floor. Choose the correct height panel for your counter and with three C107 partitions you have a carving station which meets NSF requirements.  The C107 only requires  a 2” wide mounting surface making it an ideal solution for tight areas. Custom sizes available.

Clear 1/4” Safety Tempered Glass
Thirteen Standard Widths (12”, 18”, 24”, 30”,.... 78”, 84”)
Five Standard Heights (12”, 18”, 22”, 24”, and 26”)
Narrow Mounting Space Required
Easy to Clean (1/2” air-gap under glass )
Th

Model Numbers
| Heights
Widths | 12.5” | 18.5” | 22.5” | 24.5” | 26.5”
12” | C107-1212 | C107-1218 | C107-1222 | C107-1224 | C107-1226
18” | C107-1812 | C107-1818 | C107-1822 | C107-1824 | C107-1826
24” | C107-2412 | C107-2418 | C107-2422 | C107-2424 | C107-2426
30” | C107-3012 | C107-3018 | C107-3022 | C107-3024 | C107-3026
36” | C107-3612 | C107-3618 | C107-3622 | C107-3624 | C107-3626
42” | C107-4212 | C107-4218 | C107-4222 | C107-4224 | C107-4226
48” | C107-4812 | C107-4818 | C107-4822 | C107-4824 | C107-4826
54” | C107-5412 | C107-5418 | C107-5422 | C107-5424 | C107-5426
60” | C107-6012 | C107-6018 | C107-6022 | C107-6024 | C107-6026
66” | C107-6612 | C107-6618 | C107-6622 | C107-6624 | C107-6626
72” | C107-7212 | C107-7218 | C107-7222 | C107-7224 | C107-7226
78” | C107-7812 | C107-7818 | C107-7822 | C107-7824 | C107-7826
84” | C107-8412 | C107-8418 | C107-8422 | C107-8424 | C107-8426

Options & Accessories

Glass Options        			Mounting Options			Metal Finish

Radius Corners
Frosted Logo
Frosted glass

Saddle

Chrome

The NSF requirements for vertical partition glass as a sneeze guard is that the top edge of the glass need to be 60” or more above the surface the customer stands on.  Closed ends need to be at least 18” deep from the front shield.

1990 Hartog Dr.,  San Jose, CA  95131     Ph:  408-844-8335      Fax:  408-988-4423      www.glassdivider.com

R0002 - 03/25/14