Glass
D

Divider

Crystalline Series

The Elegant Look of all Glass

Model:   C110    Class:    Partition - Sneeze Guard

Model C110 are part of the Crystalline Series which featuring the all glass look.   These partitions is characterized by the straight up front shield, and the in-line partition posts.  The support posts are turned 90° so that they are in-line with the partition glass. The C110 only needs a 2” wide mounting surface. These partitions allow a  maximum of 42” between supports.  The C110 is available in four standard heights, 18”, 22”, 24”, and 26”.

Crystal Clear 1/2” Safety Tempered Glass Supports
Narrow Mounting Surface
Four Standard heights,  18”, 22, 24, and 26”
180°, 90°, and 45° posts
Two Standard Support Styles
Th

Support Options:

18”
22”
24”
26”

3”

18”

22”

Tapered Post

Square Post

Options & Accessories

45° Corner

90° Corner

Deep
18” Depth

Extended
22” Depth

Glass Options        			Mounting Options			Metal Finish

Crystal Clear Glass
Radius Corners
Frosted Logo
Frosted glass

Mini Clamp
Center Stabilizer

Chrome

Accessories

LED Lights

NSF requires that end panels be a minimum depth of 18” from the front edge of the partition. The top edge of the sneeze guard needs to be a minimum of 60“ above the floor.

1990 Hartog Dr.,  San Jose, CA  95131     Ph:  408-844-8335      Fax:  408-988-4423      www.glassdivider.com

R0001-05/15/13