Glass
D

Divider

Crystalline Series

The Elegant Look of all Glass

Model:   C124 & C124A   Class:  Sneeze Guard - Self Service

Model C124 (straight) and the C124A (curved) are part of the Crystalline Series featuring the all glass look. The C124 is used on straight counters where the C124A is used for curved counter installations.  These sneeze guards is characterized by the clean 45° slope of the front shield.  The maximum bay size for these sneeze guards 60”.  The C124 & C124A have five styles of support which meet most any self-serve needs.  Multiple bays units have a continuous smooth front shield. This sneeze guard meets NSF requirements when the  “Deep” or “Extended” supports are used as end supports.

Crystal Clear 1/2” Safety Tempered Glass Supports
Large Bay Size (up to 60” between supports)
Six Standard Support Styles
Easy Assembly
Th

Support Options:

13”

23”

3”

Front

Open

Options & Accessories

Sculpture

8.5”

Closed
12” Depth

18”

Deep
18”Depth

22”

Extended
22” Depth

Glass Options        			Mounting Options			Metal Finish

3/8” Crystal Clear Shield
Radius Corners
Frosted Logo
Frosted glass

Tab Feet
Slim Legs
Saddle

Chrome
Powder Coat Color
RAL#
Other

Accessories

Heat Strips
LED Lights
Heat Strip / Light Combination

The “Deep” or “Extended” supports are required as end supports on NSF certified sneeze guards. The “Open”, “Closed”, and “Sculpture” supports can  be used for internal supports in multi-bay configurations

1990 Hartog Dr.,  San Jose, CA  95131     Ph:  408-844-8335      Fax:  408-988-4423      www.glassdivider.com

R0001-05/15/13