Glass
D

Divider

Crystalline Series

The Elegant Look of all Glass

Model:   C128 & C128A   Class:  Sneeze Guard - Self Service

Model C128 (straight) and the C128A (curved) are Self Serve Sneeze Guard in our Crystalline Series featuring the all glass look. This sneeze guards are characterized by the clean 45° slope on the front shield and top shelf.  These sneeze guards allow a  maximum bay size of 60”.  The C124 family has five styles of support which meet most any self-serve needs.  Multiple bays units using our sculptured center supports provide large self service areas without ugly posts getting in the way.  Our multi-bay sneeze guard systems have a continuous smooth front shield and top shelf.

Crystal Clear 1/2” Safety Tempered Glass Supports
Straight and Curved Counter Installations
Two Top Shelf Depths,  8”, and 12”
Large Bay Size (up to 60” between supports)
Five Standard Support Styles
Th

Support Options:

8”

8”
12”
18”

13”

3”

18”

22”

Front

Open

Options & Accessories

Sculpture

Deep
18” Depth

Extended
22” Depth

Glass Options        			Mounting Options			Metal Finish

3/8” Crystal Clear Glass (Shield &Top Shelf)
Radius Corners
Frosted Logo
Frosted glass

Tab Feet
Slim Legs
Saddle

Chrome
Powder Coat Color
RAL#
Other

Accessories

Heat Strips
LED Lights
Heat Strip / Light Combination

The “Deep” or “Extended” supports are required as end supports on NSF certified sneeze guards. The “Front”, “Open”, and “Sculpture” supports can  be used for internal supports in multi-bay configurations

1990 Hartog Dr.,  San Jose, CA  95131     Ph:  408-844-8335      Fax:  408-988-4423      www.glassdivider.com

R0001-05/15/13