Glass
D

Divider

Crystalline Series

The Elegant Look of all Glass

Model:   C140 & C140A   Class:  Sneeze Guard - Full Service

Model C140(straight) and C140A (curved) are part of the Crystalline Series of all glass sneeze guards.  The C140 is for use on straight counters while the C140A is used on curved counters.  These Full Service pass-over sneeze guards are characterized by their straight up front shield and top shelf.  These sneeze guards allow a maximum bay size of 84”, eliminating the need for middle support posts to span most steam or prep tables.  Multiple bay units have a continuous smooth front shield and top shelf. Removable mid shelves are optional.

Crystal Clear 1/2” Safety Tempered Glass Supports
Two Standard Heights  18-3/4” and 22-3/4”
Three Standard Depths,  12”, 18”, and 22”
Large Bay Size (up to 84” between supports)
Optional Removable Internal Shelves
Five Standard Support Styles
Th

Support Options:

12”

12”
18”

12”
18”
22”
18”

18.75”
22.75”

3”

18”

22”

Open

Sculpture

Options & Accessories

Closed
12” Depth

Deep
18”Depth

Extended
22” Depth

Glass Options        			Mounting Options			Metal Finish

3/8” Crystal Clear Top Shelf
Removable Mid-Shelf (11”, 17”, 21”)
Radius Corners
Frosted Logo
Frosted glass

Tab Feet
Slim Legs
Saddle

Chrome
Powder Coat Color
RAL#
Other

Accessories

Heat Strips
LED Lights
Heat Strip / Light Combination

The “Deep” or “Extended” supports are required as end supports on NSF certified sneeze guards. The “Open”, “Closed”, and “Sculpture” supports can  be used for internal supports in multi-bay configurations

1990 Hartog Dr.,  San Jose, CA  95131     Ph:  408-844-8335      Fax:  408-988-4423      www.glassdivider.com

R0001-05/15/13