Glass
D

Divider

Crystalline Series

The Elegant Look of all Glass

Model:   C144 & C144A   Class:  Sneeze Guard - Full Service

Model C144 (straight) and C144A (curved) are part of the Crystalline Series featuring the elegant all glass look. The C144 sneeze guard is used on straight counters where the C144A works on curved counters.  These full service (pass over) sneeze guards is characterized by the clean look of the vertical face and 45° front shields.  The maximum bay size for the family is 60 inches.  The C144 has four styles of crystal clear support which meet most any full-serve needs.  Multiple bays units have a continuous smooth front shield and can be combined with the model C124 self service sneeze guard to make a seamless transition from full service to self service.

Crystal Clear 1/2” Safety Tempered Glass Supports
Large bay length (up to 60” between supports)
Large Bay Size (up to 60” between supports)
Optional Removable Internal Shelves
Four Standard Support Styles
Straight or curved counters
Th

Support Options:

22.5”

3”

12”

18”

22”

Open

Options & Accessories

Closed
12” Depth

Deep
18”Depth

Extended
22” Depth

Glass Options        			Mounting Options			Metal Finish

3/8” Crystal Clear Shield
Removable Mid-Shelf (11”, 17”, 21”)
Radius Corners
Frosted Logo
Frosted glass

Tab Feet
Slim Legs
Saddle

Chrome
Powder Coat Color
RAL#
Other

Accessories

Heat Strips
LED Lights
Heat Strip / Light Combination

The “Deep” or “Extended” supports are required as end supports on NSF certified sneeze guards. The “Open”, and “Closed” supports can  be used for internal supports in multi-bay configurations

1990 Hartog Dr.,  San Jose, CA  95131     Ph:  408-844-8335      Fax:  408-988-4423      www.glassdivider.com

R0001-05/15/13