Model C228 is a Self Serve Island Sneeze Guard in our Crystalline Series featuring the all glass look. This island sneeze guards are characterized by the clean 45° slope on the front shields and center top shelf.  These sneeze guards allow a  maximum bay size of 60” and various widths to fit the counter top.  The C228 family has five styles of support which can meet most any self-serve layout needs.  Multiple bays units using our sculptured center supports provide large self service areas without ugly posts getting in the way.  Our multi-bay sneeze guard systems have a continuous smooth shields and top shelf.

Crystal Clear 1/2” Safety Tempered Glass Supports
Straight and Curved Counter Installations
Three Standard Widths,  24”, 28”,34” plus variable
Large Bay Size (up to 60” between supports)
Five Standard Support Styles
Th

Support Options:

13”

24”
28”
36”

Front / Edge

Open

Options & Accessories

24”
28”
34”

Sculpture

Closed

VAR”

Variable Closed

Glass Options        			Mounting Options			Metal Finish

3/8” Crystal Clear Glass (Shield &Top Shelf)
Radius Corners
Frosted Logo
Frosted glass

Tab Feet
Slim Legs
Saddle

Chrome
Powder Coat Color
RAL#
Other

Accessories

Heat Strips
LED Lights
Heat Strip / Light Combination

The “Closed” or “Variable-Closed” supports are required as end supports on NSF certified sneeze guards. The “Front”, “Open”, and “Sculpture” supports can  be used for internal supports in multi-bay configurations