Glass
D

Divider

Crystalline Series

The Elegant Look of all Glass

Model:   C130    Class:  Sneeze Guard - Self Service

Model C130 is part of the Crystalline Series featuring the all glass look.  This sneeze guard model is characterized by the flat shield. Designers like the clean low profile of this sneeze guard.   The shield is support the NSF required 13” above the counter has made.  The maximum bay size for these sneeze guards 60”, and custom sizes and shapes are available.  The C130 has five styles of support which meet most any self-serve needs.  Multiple bays units have a continuous smooth top shield.

Crystal Clear 1/2” Safety Tempered Glass Supports
Large Bay Size (up to 60” between supports)
Six Standard Support Styles
Easy Assembly
Th

Support Options:

Front-Edge

Open

Options & Accessories

Sculpture

Split Sculpture

Variable-Closed

Extended
22” Depth

Glass Options        			Mounting Options			Metal Finish

Custom Shape
Frosted Logo
Frosted glass

Tab Feet
Slim Legs
Saddle

Chrome
Powder Coat Color
RAL#
Other

Accessories

Heat Strips
LED Lights
Heat Strip / Light Combination

The “Var-Closed” or “Extended” supports are required as end supports on NSF certified sneeze guards. The “Edge”, “Open”, “Sculpture” and “Split-Sculpture” supports can  be used for internal supports in multi-bay configurations

1990 Hartog Dr.,  San Jose, CA  95131     Ph:  408-844-8335      Fax:  408-988-4423      www.glassdivider.com

R0001-05/15/13