Glass
D

Project Name:
Location:
Item #:	    		          Qty:
Model #:

Divider

The Sneeze Guard Company

Model:      C400

Class:    Partition - Sneeze Guard -  ( vertical shield )

Model C400 represents a family of free-standing partition sneeze guards assembled using CRG construction.  The only hardware on these units are the flanged boots for counter attachment.  The C400 is an elegant way to quickly meet your sneeze guard requirements.  The standard C400 has a clear 1/4” front shield and two 1/2” crystal clear support posts.  There are four standard heights, and eight standard widths . There are twelve shield glass options. The NSF height requirement for a sneeze guard partition is a minimum 60” overall height.   Always review your sneeze guard plans with your health department.  Custom sizes available.

Clear 1/4” Safety Tempered Glass   (shield)
Crystal Clear 1/2” Support Posts
Eight Standard Widths ( 18”, 24”, 30”, 36’, 42”, 48”, 54”, 60”)
Four Standard Heights (18”, 22”, 24”, 26”)
All Glass Construction (except attachement boot)
Easy to Clean (1/2” air-gap under glass )
Th

Model Numbers
| Heights
Widths | 18.5” | 22.5” | 24.5” | 26.5”
18” | C400-1818 | C400-1822 | C400-1824 | C400-1826
24” | C400-2418 | C400-2422 | C400-2424 | C400-2426
30” | C400-3018 | C400-3022 | C400-3024 | C400-3026
36” | C400-3618 | C400-3622 | C400-3624 | C400-3626
42” | C400-4218 | C400-4222 | C400-4224 | C400-4226
48” | C400-4818 | C400-4822 | C400-4824 | C400-4826
54” | C400-5418 | C400-5422 | C400-5424 | C400-5426
60” | C400-6018 | C400-6022 | C400-6024 | C400-6026

Options & Accessories

Glass Options        					     	Attachement		Metal Finish

1/4” Clear  		      3/8” Clear	         1/2” Clear
1/4” Crystal Clear 	      3/8” Crystal Clear         1/2” Crystal Clear
1/4” Frosted	      3/8” Frosted
1/4” Bronze	      3/8” Bronze
1/4” Gray		      3/8” Gray

Flanged Boot (2” x 3”)

Chrome
Powder Coat Color
RAL#

The NSF requirements for vertical partition glass as a sneeze guard is that the top edge of the glass needs to be 60” or more above the surface the customer stands on.

1990 Hartog Dr.,  San Jose, CA  95131     Ph:  408-844-8335      Fax:  408-988-4423      www.glassdivider.com

R0002 - 05/10/15