Glass
D

Project Name:
Location:
Item #:	    		          Qty:
Model #:

Divider

The Sneeze Guard Company

Model:   C408

Class:    Partition - Sneeze Guard -  ( vertical shield with 4” top shelf )

Model 408 represents a family of free-standing partition sneeze guards using CRG construction.  The only hardware on these units is the flanged boot for counter attachment.  The C408 is quick and easy way to meet your sneeze guard needs.  The C408 has a straight up shield and a 4” mini top shelf.  There are four standard heights, and eight standard widths . The NSF height requirements for a sneeze guard partition is for the overall height to be a minimum of 60”. The mini top shelf should contributes to the overall height requirement.  Always review you sneeze guard plans with your health department.  Custom sizes available.

Clear 1/4” Safety Tempered Glass   (shield & Top)
Crystal Clear 1/2” Support Posts
Eight Standard Widths (18”, 24”, 30”, 36’, 42”, 48”, 54”, 60”)
Four Standard Heights (18”, 22”, 24”, 26”)
All Glass Construction (except for attachement boot)
Easy to Clean (1/2” air-gap under glass )
Th

Model Numbers
| Heights
Widths | 18.75” | 22.75” | 24.75” | 26.75”
18” | C408-1818 | C408-1822 | C408-1824 | C408-1826
24” | C408-2418 | C408-2422 | C408-2424 | C408-2426
30” | C408-3018 | C408-3022 | C408-3024 | C408-3026
36” | C408-3618 | C408-3622 | C408-3624 | C408-3626
42” | C408-4218 | C408-4222 | C408-4224 | C408-4226
48” | C408-4818 | C408-4822 | C408-4824 | C408-4826
54” | C408-5418 | C408-5422 | C408-5424 | C408-5426
60” | C408-6018 | C408-6022 | C408-6024 | C408-6026

Options & Accessories

Glass Options        					            Mounting		Metal Finish

1/4” Clear  		      3/8” Clear	         1/2” Clear
1/4” Crystal Clear 	      3/8” Crystal Clear         1/2” Crystal Clear
1/4” Gray		      3/8” Gray
1/4” Bronze	      3/8” Bronze

Flanged Boot (2” x 3”)

Chrome
Powder Coat Color
RAL#

The NSF requirements for vertical partition glass as a sneeze guard is that the top edge of the glass need to be 60” or more above the surface the customer stands on.  The mini top shelf should contribute to the shield coverage.

1990 Hartog Dr.,  San Jose, CA  95131     Ph:  408-844-8335      Fax:  408-988-4423      www.glassdivider.com

R0002 - 06/04/15